From 7e3dc4ace4c6b21bc68264dc76c8c442aec8031a Mon Sep 17 00:00:00 2001
From: Ashelyn Rose <git@tempest.dev>
Date: Mon, 8 May 2023 14:45:55 -0600
Subject: standardize component structure more

---
 app/not-found.tsx | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'app/not-found.tsx')

diff --git a/app/not-found.tsx b/app/not-found.tsx
index 44753b0..b3a0fd4 100644
--- a/app/not-found.tsx
+++ b/app/not-found.tsx
@@ -1,12 +1,14 @@
+import InfoBar from "~/components/InfoBar/"
+
 export default function NotFound() {
   return (
     <>
       <h1 className="pageTitle">Not Found (404)</h1>
       <main className="mainColumn">
-        <aside className="infobar">
+        <InfoBar>
           <strong>Error:&nbsp;</strong>
           Unable to find the requested resource
-        </aside>
+        </InfoBar>
 
         <p>
           Feel free to start again from the <a href="/">home page</a>, or
-- 
cgit 1.4.1

